Requirements

PureSight runs on an individual user computer running under one of the following operating systems:

1.	Windows 95 with an update to the Winsock2 library.

1.	Windows 98.

1.	Windows NT with service pack 4

PureSight runs on all the available browsers.

Minimum hardware requirements are 32MB RAM and 12MB free hard-disk space.


Installation

The program is installed by running the Setup.exe file.

When running the setup file, the user is prompted to enter an Administrator's password.

This password will be needed later on for disabling PureSight and defining the defaults settings.


Administrator

PureSight defines a password protected Administrator.

The Administrator has control over the following options:

1.	Turn PureSight on or off.

1.	Manages the static block list of sites containing sexually explicit material, and the static non block list of sites containing non sexually explicit material.

1.	Manages the Dynamic block list of sites containing sexually explicit material and the dynamic non block list of sites containing non sexually explicit material.

1.	General preferences of PureSight.

1.	Uninstallation of PureSight.

The Administrator's password is set during the installation of PureSight and can be changed at any time through the pop-up menu from the taskbar, see Changing Administrator's Password.


Block and Non Block lists

PureSight allows the Administrator to customize the blocking of Internet sites, by using two lists: Block list and Non Block list.  These lists contain hosts and URLs that the Administrator wishes to Block\Not block.  These lists can be updated from the pop-up menu at the taskbar icon.

If a host is in the non block list then every URL that belongs to that host will not be filtered.

For example: if the host: www.playboy.com is in the block list then the URL: www.playboy.com/index.html will be blocked automatically.


Uninstall

To uninstall PureSight, from the start menu choose Settings and then select Control Panel.  In the Control Panel double click the Add/Remove Programs icon.  In the open dialog window select PureSight and then press the Add/Remove button.  When prompted, enter the Administrator’s password.

Note: In order to complete the uninstallation you must know the Administrator's password.


Add a URL or host to the block or non block list

To Add a URL or host to the block or non block list select Options from the pop-up menu on the task bar and enter the Administrator password.

Select the block list tab or the non block list tab.

Select Add. This dialog will open.

Enter a URL or a host and press Add.

After adding all the hosts and URLs press Ok.


Getting Started


Introduction


Step by Step


On / Off Option

PureSight can be turned off by the Administrator and on by any user.

From the pop-up menu in the taskbar select Turn On or Turn Off.

When prompted enter the Administrator’s password in the dialog.

After changing the working mode of PureSight you can see that the icon on the taskbar has changed.

Red eye means that PureSight will not block any site.

Green eye means that PureSight will check all sites and block them if necessary.


Changing Administrator's Password

The Administrator can change it's passwords.

To change the Administrator’s password select Options from the pop-up menu on the task bar and enter the Administrator password.  From the preferences tab press the change password button.

The following dialog will then appear.

Enter the desired password in both slots and press OK to save your changes.


Preferences

The Administrator has control over the settings of the preferences.

These include:

1. Rsaci support: use the Rsaci rating system when filtering sites.

2. SafeSurf: use the SafeSurf rating system when filtering sites.

3. Changing the Administrator's password.

The first two setting relate to the new PICS rating system that both Rsaci and SafeSurf have implemented.

See Change Preferences for more information.


Change Preferences

To change the preferences select Options from the pop-up menu on the task bar and enter the Administrator password and select the Preferences tab.

Select the desired settings.


Edit the static block and non block lists

To edit the block or non block list select Options from the pop-up menu on the task bar and enter the Administrator password.

Select the block list tab or the non block list tab.

You can either add, remove or select the default list button.


Remove a URL or host from the block or non block list

To remove a URL or host from the block or non block list select Options from the pop-up menu on the task bar and enter the Administrator password.

Select the block list tab or the non block list tab.

Choose the URLs and hosts you wish to remove (mark them with the mouse).

Press Remove.


What is PureSight

PureSight uses new content sensitive filtering technology to block access to sexually explicit or pornographic material on the Web.  PureSight examines each Internet site and dynamically determines the nature of the site by focusing on understanding the content of the site.  PureSight blocks Web sites containing objectionable material automatically, before they are displayed on the browser, displaying an appropriate message to the user.  PureSight does not block Web material regarding issues involving sexual preference, sexual education or health, breast cancer, sexually transmitted diseases and sexual harassment, unless they also contain offensive content that are deemed inappropriate for children to view.


Dynamic Sex and Non Sex lists

PureSight enables the Administrator to manage two dynamic lists: the dynamic sex list and the dynamic non sex list.  These lists contain Internet sites that  were recently checked and classified by PureSight.  The dynamic sex list contains Internet sites that were classified as containing adult material and that need to be blocked.  The dynamic non sex list contains Internet sites that were classified as “clean” sites and should not be blocked.

The settings for these two lists can be changed.  These setting include whether or not to use the Dynamic lists and what is the maximum time that can pass before rechecking the site.

For more information go to:  Setting preferences for the dynamic lists


Setting preferences for the dynamic lists

To set the preferences for the dynamic lists select Options from the pop-up menu on the task bar and enter the Administrator password.

Select the dynamic sex list tab or the dynamic non sex list tab.

Set the preferred settings.

In order to remove all of the sites stored press Clear.

In order to set the default settings press Default.